\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage{natbib}




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}



\usepackage{float}








\begin{document}

\title{Net Load Redistribution Attacks on Nodal Voltage Magnitude Estimation in
AC Distribution Networks}



\author[1]{hang zhang }%
\author[2]{Bo Liu }%
\author[2]{Hongyu Wu }%
\affil[1]{Kansas State University}%
\affil[2]{Affiliation not available}%


\vspace{-1em}



  
  \date{May 18, 2024}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup





\selectlanguage{english}
\begin{abstract}
This paper presents a false data injection attack against AC state
estimation in distribution system. Such attack is called net local load
redistribution attacks (NRLA) which is aimed at misleading the
distribution system operator to observe illusory under-voltage issues in
the AC state estimation. The attack vector is constructed with only
local network information.\\%
\end{abstract}%



\sloppy


\textbf{Hosted file}

\verb`Net Load Redistribution Attacks on Nodal Voltage Magnitude Estimation in AC Distribution Networks.docx`  available at \url{https://authorea.com/users/661754/articles/675789-net-load-redistribution-attacks-on-nodal-voltage-magnitude-estimation-in-ac-distribution-networks}

\selectlanguage{english}
\FloatBarrier
\end{document}

