\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage{natbib}




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}



\usepackage{float}








\begin{document}

\title{Impedance Differential Protection for Double Circuit transmission Lines
Based on Distributed Parameters}



\author[1]{talib challab}%
\author[2]{Heresh Seyedi}%
\author[2]{Naghi Rostami}%
\affil[1]{University of Tabriz}%
\affil[2]{University of Tabriz Faculty of Electrical and Computer Engineering}%


\vspace{-1em}



  
  \date{May 24, 2024}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup





\selectlanguage{english}
\begin{abstract}
This paper presents an impedance differential protection scheme for a
double-circuit transmission line. Current and voltage measurements at
both line ends enable the formulation of a differential impedance that
serves as an effective protection standard for transmission lines. The
proposed method takes into consideration the effects of the line's shunt
capacitance since it is based on the distributed parameter line model.
The proposed protection system is able to detect the faults and also has
the ability to determine the fault location. In addition, the relay
offers dependability, and selectivity for differentiating between
internal and external faults, thereby stays steady against external
faults. The proposed method has been tested with varying fault
resistances and under various fault conditions. The effectiveness,
security, and dependability of the method are verified by the simulation
results.%
\end{abstract}%



\sloppy




\selectlanguage{english}
\FloatBarrier
\end{document}

