\documentclass[10pt]{article}

\usepackage{fullpage}
\usepackage{setspace}
\usepackage{parskip}
\usepackage{titlesec}
\usepackage[section]{placeins}
\usepackage{xcolor}
\usepackage{breakcites}
\usepackage{lineno}
\usepackage{hyphenat}





\PassOptionsToPackage{hyphens}{url}
\usepackage[colorlinks = true,
            linkcolor = blue,
            urlcolor  = blue,
            citecolor = blue,
            anchorcolor = blue]{hyperref}
\usepackage{etoolbox}
\makeatletter
\patchcmd\@combinedblfloats{\box\@outputbox}{\unvbox\@outputbox}{}{%
  \errmessage{\noexpand\@combinedblfloats could not be patched}%
}%
\makeatother


\usepackage[round]{natbib}
\let\cite\citep




\renewenvironment{abstract}
  {{\bfseries\noindent{\abstractname}\par\nobreak}\footnotesize}
  {\bigskip}

\titlespacing{\section}{0pt}{*3}{*1}
\titlespacing{\subsection}{0pt}{*2}{*0.5}
\titlespacing{\subsubsection}{0pt}{*1.5}{0pt}


\usepackage{authblk}


\usepackage{graphicx}
\usepackage[space]{grffile}
\usepackage{latexsym}
\usepackage{textcomp}
\usepackage{longtable}
\usepackage{tabulary}
\usepackage{booktabs,array,multirow}
\usepackage{amsfonts,amsmath,amssymb}
\providecommand\citet{\cite}
\providecommand\citep{\cite}
\providecommand\citealt{\cite}
% You can conditionalize code for latexml or normal latex using this.
\newif\iflatexml\latexmlfalse
\providecommand{\tightlist}{\setlength{\itemsep}{0pt}\setlength{\parskip}{0pt}}%

\AtBeginDocument{\DeclareGraphicsExtensions{.pdf,.PDF,.eps,.EPS,.png,.PNG,.tif,.TIF,.jpg,.JPG,.jpeg,.JPEG}}

\usepackage[utf8]{inputenc}
\usepackage[english]{babel}










\begin{document}

\title{~~~~~~~~~~~~~~~~~~ Categories And Types Of Concrete Foundations~~~~~}



\author[1]{Easter Concrete}%
\affil[1]{Affiliation not available}%


\vspace{-1em}



  
  \date{May 26, 2024}


\begingroup
\let\center\flushleft
\let\endcenter\endflushleft
\maketitle
\endgroup








\sloppy


Concrete is known for being a relatively resilient and strong material
that can be molded easily when combined with water. It is one of the
most pocket-friendly raw material for building construction. It is one
of the most commonly used material by commercial as well as \textbf{}
residential foundation contractors. There are several categories of
concrete foundations.

Though concrete is a very strong material, it has some backdrops. Under
moist conditions like prolonged rains or monsoons, water might penetrate
inner layers of concrete leading to cracks. It means that one need to
check the signs for damage regularly so that bad things can be fixed
within some time. Our concrete foundation contractors know how to build
a concrete patio your yard. With respect to concrete foundation, there
are several types. The first type of concrete foundation is known as
T-shaped concrete foundation. It is one of the most commonly used
foundations and is ideal when prime objective is to for supporting
structures in freezing zones.

Under normal conditions, frozen grounds can exert extra pressure over
the foundation, the T-shaped foundations have uncommon designs that
makes them less vulnerable to the damages that can be caused by frozen
ground. You may want to place a segment of flat footing beneath the
expected frost line, the walls can be stretched up from that point. The
walls wouldn't necessarily be as wide as their footing. So the final
shape of the structure is an inverted T and it is mainly known for
providing resistance to final effects of freezing grounds. The Cost to
install new foundation is usually lower as compared to the other type.
\href{http://www.easterconcretesanantonio.com/articles/8-reasons-poured-concrete-retaining-wall-is-better-than-timber/}{Poured
concrete retaining walls} can be colored, textured, accented with
embedded objects and much more.

The nest type is the slab-on-grade foundation. While it is also a widely
used foundation, it is mostly used in areas where ground doesn't
freezes. Under this category, slab is made as a single layer of multiple
inches-thick concrete foundation. You will need to pour the slab much
thicker over the edges for a firm foundation. The
\href{http://www.easterconcretesanantonio.com/foundations/cost-of-foundation/}{Cost
to pour foundation} is thus little more than others. You can always use
reinforcing rods or steel for additional strength for the thickened
edge. For improving drainage, the slab needs to rest over the bed of
crushed gravel. You can also embed~ some kind of wire mesh in the
concrete as it will reduce any further chances of cracking. Even though
slab on grade is one of the most ideal foundations for dry grounds, it
still needs reinforcement and insulation to stay safe from frost.

\selectlanguage{english}
\FloatBarrier
\end{document}

